Busoni/Fried/Schnabel/Clark/Kerr 1911
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Ferruccio Busoni, Oskar Fried, Arthur Schnabel, Thomas Edward Clark, Alfred Kerr, Für Arnold Schönberg, Pan, 4173165-7, 1, 22, 741