Baker 1906
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Ray Stannard Baker, New music for an old world, Dr. Thaddeus Cahill’s Dynamophone. An extraordinary electrical invention for producing scientifically perfect music, McClure’s Magazine, 4731371-7, 27, 3, 291–301