Mittersill
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Mittersill
location: 47.266667 12.466667
identifier: 4101059-0