Liechtensteinstraße 68/70 (Wien)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Liechtensteinstraße 68/70
location: Liechtensteinstraße 68/70
Wien
48.226809 16.356697
event: 1903–1910-01
Wohnort Arnold Schönbergs (Stuckenschmidt 1974, S. 73, S. 118).