Kaiserstuhl (Aargau)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Kaiserstuhl
location: Aargau, 47.5692 8.4186
identifier: 4096880-7