Certosa di Pavia (Lombardei)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Certosa di Pavia
location: Lombardei, 45.257 9.148278
identifier: 4200932-7
identifier: 3179020