St.-Ursen-Kathedrale (Solothurn)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

St.-Ursen-Kathedrale
location: Solothurn, 47.20842 7.53964
identifier: 4772370-1