Hotel Bernerhof (Bern)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Bernerhof
location: Bundesgasse 3
Bern
46.94621 7.4416
identifier: 7512765-9