Bradford
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Bradford
location: 53.794722 -1.756389
identifier: 4080507-4
identifier: 2654993