Winterfeldtstraße 25a (Schöneberg, Berlin)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Winterfeldtstraße 25a
location: Schöneberg, Berlin, 52.496567 13.357011
Wohnort Hugo Leichtentritts