Mecklenburg
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Mecklenburg
location: 53.5 12
identifier: 4038197-3
identifier: 2872570