Hotel Badeschloss (Bad Gastein)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Badeschloss
location: Straubingerplatz 4
Bad Gastein
47.113979 13.136934