Hotel Post
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hotel Post
location: Kaiser-Franz-Josef-Straße 3-5
Bad Ischl
47.712295 13.622853
1927 errichtetes Hotel.
identifier: 4527775-8