Stolpe (Hohen Neuendorf)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Stolpe; Stolpe
location: 52.660833 13.259444
identifier: 16011603-X
identifier: 2826543