Robert Schumann
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Schumann, Robert
identifier: 118611666
birth: 1810-06-08, Zwickau
death: 1856-07-29, Endenich
occupation: Komponist
occupation: Musikkritiker