Johann Sebastian Bach
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Bach, Johann Sebastian
identifier: 11850553X
identifier: 12304462
identifier: 0000000122764157
birth: 1685-03-31, 1685-03-21, Eisenach
death: 1750-07-28, Leipzig
occupation: Komponist
occupation: Kantor