Jacques Offenbach
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Offenbach, Jacques; Jakob Offenbach
identifier: 118589598
identifier: 10034167
identifier: 0000000121204289
birth: 1819-06-20, Köln
death: 1880-10-05, Paris
occupation: Komponist
occupation: Dirigent
occupation: Violoncellist
occupation: Theaterdirektor