Hans Kindler
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Kindler, Hans; Johannes Hendrikus Philip Kindler
identifier: 1018203141
birth: 1892-01-08, Rotterdam
death: 1949-08-30, Watch Hill, Rhode Island
occupation: Violoncellist
occupation: Dirigent