Margarethe Conrad
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Conrad, Margarethe
birth: 1881-12-12, Stuttgart
death: 1973-11-11, Stuttgart
occupation: Schauspielerin