Clara Schumann
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Schumann, Clara; Clara Josephine Wieck; Clara Schumann
identifier: 11861164X
identifier: 44499359
identifier: 0000000121305653
birth: 1819-09-13, Leipzig
death: 1896-05-20, Frankfurt am Main
occupation: Komponistin
occupation: Pianistin