Willy Renner
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Renner, Willy
identifier: 128573406
identifier: 174145542451696640155
birth: 1883-05-28, Oldisleben
death: 1955-03-30, Frankfurt am Main
occupation: Pianist
occupation: Komponist
occupation: Klavierpädagoge