H. G. Wells
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wells, H. G.; Herbert George Wells; H. G. Wells
identifier: 118643266
identifier: 97006424
identifier: 0000000122832703
birth: 1866-09-21, Bromley (Kent)
death: 1946-08-13, London
occupation: Schriftsteller