Eduard Daeniker
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Daeniker, Eduard
birth: 1892
death: 1963-11-12, Bern
occupation: Geiger