Henry Wood
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wood, Henry
birth: 1868-03-03, London
death: 1944-08-19, Hitchin
occupation: Dirigent