Felix Ludwig Oppenheimer
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Oppenheimer, Felix Ludwig
birth: 1908-10-06
death: 1972-04-24