Franciska Caroline Wax
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Wax, Franciska Caroline; Frances Caroline Leichtentritt
birth: 1855-02-21
death: 1951-02-26, Cambridge (MA)
Lebensdaten gemäß Grabstein, Find a Grave