Wilhelm Gericke
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Gericke, Wilhelm; Guilielmus Spitzi
identifier: 122445643
identifier: 15652794
identifier: 0000000040153416
birth: 1845-04-18, 1845-05-18, Schwanberg
death: 1925-10-27, Wien
occupation: Dirigent
occupation: Komponist
affiliation: Musikdirektor des Boston Symphony Orchestra
affiliation: Musikdirektor des Boston Symphony Orchestra