Schenker, Heinrich: Vorüber op. 7 Nr. 3
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Heinrich Schenker, Vorüber, 7, 3, Albert Jungmann & C. Lerch, Wien, Wiener Singakademie