Franz Schubert
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Schubert, Franz
identifier: 118610961
birth: 1797-01-31, Wien
death: 1828-11-19, Wien
occupation: Komponist