Arthur Nikisch
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Nikisch, Arthur
identifier: 118786253
identifier: 74038494
identifier: 0000000081543023
birth: 1855-10-12, Lébényi Szent-Miklós
death: 1922-01-23, Leipzig
occupation: Dirigent
occupation: Geiger
affiliation: Chefdirigent der Berliner Philharmoniker