Max Reinhardt
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Reinhardt, Max; Max Goldmann; Max Reinhardt
identifier: 118599380
birth: 1873-09-09, Baden
death: 1943-10-31, New York
occupation: Theaterintendant
occupation: Schauspieler
occupation: Regisseur
affiliation: Leiter des Deutschen Theaters in Berlin