Luigi Cherubini
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Cherubini, Luigi; Maria Luigi Carlo Zenobio Salvatore Cherubini
identifier: 118520377
identifier: 88663809
identifier: 0000000121428442
birth: 1760-09-14, Florenz
death: 1842-03-15, Paris
occupation: Komponist
occupation: Musiktheoretiker
occupation: Kompositionslehrer