Fidelio Friedrich Finke
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Finke, Fidelio Friedrich
identifier: 122963814
birth: 1891-10-22, Josefsthal
death: 1968-06-12, Dresden
occupation: Komponist