Reinhold Laquai
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Laquai, Reinhold
identifier: 118825933
identifier: 33407256
identifier: 0000000091116658
birth: 1894-05-01, Molfetta
death: 1957-10-03, Oberrieden
occupation: Komponist
occupation: Organist
occupation: Pianist
affiliation: 1920–, Klavierlehrer am Zürcher Konservatorium