Arrigo Serato
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Serato, Arrigo
identifier: 117466492
identifier: 90205425
identifier: 0000000013545799
birth: 1877-11-07, Bologna
death: 1948-12-27, Rom
occupation: Geiger