John Knowles Paine
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Paine, John Knowles
identifier: 118789244
identifier: 19872817
identifier: 0000000080991879
birth: 1839-01-09, Portland (Maine)
death: 1906-04-25, Cambridge (Massachusetts)
occupation: Komponist
occupation: Organist
occupation: Musikpädagoge
affiliation: Dozent an der Harvard University