Philip James
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

James, Philip
identifier: 142550418
identifier: 37182955
identifier: 0000000081163434
birth: 1890-05-17, Jersey City (New Jersey)
death: 1975-11-01, Southampton (New York)
occupation: Organist
occupation: Dirigent
occupation: Komponist