Florent Schmitt
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Schmitt, Florent
identifier: 119456001
identifier: 12492803
identifier: 0000000108710283
birth: 1870-09-28, Blâmont
death: 1958-08-17, Neuilly-sur-Seine
occupation: Komponist