Oskar Merikanto
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Merikanto, Oskar; Frans Oskar Mattson
identifier: 119526786
identifier: 74049359
identifier: 000000008154339X
birth: 1868-08-05, Helsinki
death: 1924-02-17, Oitti
occupation: Komponist
occupation: Pianist
occupation: Organist
affiliation: Orgellehrer am Musikinstitut Helsinki