Augusta Lawler Curtis
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Curtis, Augusta Lawler; Augusta Lawler Stacey; Augusta Lawler Curtis
birth: 1841-06-28, Chester
death: 1934-11-14, New York