Walter Henry Rothwell
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Rothwell, Walter Henry
birth: 1872-09-22, London
death: 1927-03-12, Santa Monica
occupation: Dirigent