Hermann Felix Oppenheimer
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Oppenheimer, Hermann Felix
birth: 1901-04-04, Wien
death: 1977-05-06, Salzburg