Leopold Stokowski
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Stokowski, Leopold; Leopold Anthony Stokowski
identifier: 117267384
identifier: 24788527
identifier: 0000000461263816
birth: 1882-04-18, London
death: 1977-09-13, Nether Wallop
occupation: Dirigent
affiliation: Leiter des Philadelphia Orchestra