Giacomo Carissimi
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Carissimi, Giacomo
birth: 1605-04-18, Marino (Latium)
death: 1674-01-12, Rom
identifier: 118668404
identifier: 14957743
identifier: 0000000108726007
occupation: Komponist