Lilly von Haartman
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Haartman, Lilly von; Maria Augusta von Haartman; Lilly; Maria Augusta Wasastjerna
birth: 1872-09-07, Helsinki
death: 1948-11-17, Helsinki
occupation: Pianistin