Carl Kihlman
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Kihlman, Carl; Carl Edvard Kihlman; Karl Edward Kihlman
birth: 1868-05-16, Göteborg
death: 1948-01-09, Stockholm
occupation: Geiger