Benneckenstein
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Benneckenstein
location: 51.667222 10.716944
identifier: 5159791-3