Watch Hill (Westerly, Rhode Island)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Watch Hill
location: Westerly, Rhode Island, 41.313611 -71.849722
identifier: 10357306-9