Hôtel Krone (Solothurn)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hôtel Krone; Hôtel La Couronne
location: Hauptgasse 64
Solothurn
47.208084 7.538470
identifier: 6522747