Hôtel des Trois Rois (Basel)
availability: Attribution-NonCommercial-ShareAlike 4.0 International (CC BY-NC-SA 4.0) (http://creativecommons.org/licenses/by-nc-sa/4.0/)

Hôtel des Trois Rois
location: Blumenrain 8
Basel
47.560439 7.587674
identifier: 7553953-6